<template>
<!-- 动力监测日数据录入 -->
    <div class="powerMonitoringDayData">
        <div class="box">
            <div class="box-top">
                <el-form
                    style="overflow: hidden;"
                    :style="filterForm.show ? null : { height: '0px' }"
                    size="mini"
                    label-width="75px"
                >
                    <el-row>
                        <el-col :span="6">
                            <el-form-item label="监测项目名称" label-width="80px">
                                <el-select
                                    filterable clearable
                                    v-model="filterForm.data.itemname"
                                    placeholder=""
                                    multiple
                                    collapse-tags
                                    style="width: 100%;"
                                >
                                    <el-option
                                        v-for="item of nameObj.itemname.arr"
                                        :key="item.id"
                                        :value="item.id"
                                        :label="item.name"
                                    ></el-option>
                                </el-select>
                            </el-form-item>
                        </el-col>
                        <el-col :span="6">
                            <el-form-item label="系统名称">
                                <el-select
                                    filterable clearable
                                    v-model="filterForm.data.powersystemname"
                                    placeholder=""
                                    multiple
                                    collapse-tags
                                    style="width: 100%;"
                                >
                                    <el-option
                                        v-for="item of nameObj.powersystemname.arr"
                                        :key="item.id"
                                        :value="item.id"
                                        :label="item.name"
                                    ></el-option>
                                </el-select>
                            </el-form-item>
                        </el-col>
                        <el-col :span="6">
                            <el-form-item label="监测点名称">
                                <el-select
                                    filterable clearable
                                    v-model="filterForm.data.powermonitorname"
                                    placeholder=""
                                    multiple
                                    collapse-tags
                                    style="width: 100%;"
                                >
                                    <el-option
                                        v-for="item of nameObj.powermonitorname.arr"
                                        :key="item.id"
                                        :value="item.id"
                                        :label="item.name"
                                    ></el-option>
                                </el-select>
                            </el-form-item>
                        </el-col>
                    </el-row>
                    <el-row>
                        <el-col :span="6">
                            <el-form-item label="监测日期">
                               <zj-timegran-date
                                    v-model="filterForm.data.monitordate"
                                    style="width: 100%;"
                                    :type="'daterange'"
                                    :oneFoo="getTableData"
                                    :custom ="1"
                                ></zj-timegran-date>
                            </el-form-item>
                        </el-col>
                        <el-col :span="6">
                            <el-form-item label="化验单号">
                                <el-input clearable
                                    style="width: 100%;"
                                    v-model="filterForm.data.batchno"
                                >
                                </el-input>
                            </el-form-item>
                        </el-col>
                    </el-row>
                </el-form>
                <div class="box-top-gjl">
                    <el-button
                        class="button"
                        type="primary"
                        size="mini"
                        icon="el-icon-plus"
                        v-privilege="activeMenu + 'PUT'"
                        :loading="loading"
                        @click="but_edit_plural()"
                    >保存</el-button>
                    <div style="float:right; text-align: right;">
                        <el-button
                            class="button"
                            type="primary"
                            size="mini"
                            icon="el-icon-search"
                            v-privilege="activeMenu + 'QUERY'"
                            @click="getTableData(1)"
                        >查询</el-button>
                        <!-- <el-button
                            class="button"
                            type="primary"
                            size="mini"
                            icon="el-icon-refresh"
                            v-privilege="activeMenu + 'QUERY'"
                            @click="tableDataCancel();"
                        >重置</el-button> -->
                        <el-button
                            size="mini"
                            :icon="filterForm.show ? 'el-icon-caret-top' : 'el-icon-caret-bottom'"
                            :title="filterForm.show ? '收起搜索区' : '展开搜索区'"
                            @click="filterForm.show = !filterForm.show;
                                $nextTick(() => {
                                    singleTableHeight = getRoleHeight($refs['singleTable'].$el) - 45;
                                }
                            );"
                        >{{ filterForm.show ? '收起' : '展开' }}</el-button>
                    </div>
                </div>
            </div>
            <div class="box-bottom">
                <el-form
                    size="mini"
                    ref="dialog_form_arr"
                    label-width="0px"
                    :model="tableFormDataObj"
                >
                <el-table
                    stripe
                    id="singleTable"
                    ref="singleTable"
                    :data="tableData"
                    v-loading="tableLoading"
                    style="width: 100%;"
                    :height="singleTableHeight"
                    border
                    size="mini"
                    highlight-current-row
                    @selection-change="handleSelectionChange"
                >
                    <el-table-column
                                sortable
                                type="selection"
                                width="40"
                                align="center"
                                fixed="left"
                    >
                    </el-table-column>
                    <el-table-column
                            prop="seq"
                            label="序号"
                            fixed="left"
                            width="50px"
                            :show-overflow-tooltip="true"
                    ></el-table-column>
                    <el-table-column
                        sortable
                        prop="detectiondepartment"
                        label="监测部门"
                        min-width="100px"
                        :show-overflow-tooltip="true"
                    >
                     <template slot-scope="scope">
                            <span>{{ nameObj.detectiondepartment.obj[scope.row.detectiondepartment] ? nameObj.detectiondepartment.obj[scope.row.detectiondepartment] : scope.row.detectiondepartment }}</span>
                        </template>
                    </el-table-column>
                    <el-table-column
                        sortable
                        prop="powersystemname"
                        label="系统名称"
                        min-width="100px"
                        :show-overflow-tooltip="true"
                    >
                    <template slot-scope="scope">
                            <span>{{ nameObj.powersystemname.obj[scope.row.powersystemname] ? nameObj.powersystemname.obj[scope.row.powersystemname] : scope.row.powersystemname }}</span>
                        </template>
                    </el-table-column>
                    <el-table-column
                        sortable
                        prop="powermonitorname"
                        label="监测点名称"
                        min-width="100px"
                        :show-overflow-tooltip="true"
                    >
                    <template slot-scope="scope">
                            <span>{{ nameObj.powermonitorname.obj[scope.row.powermonitorname] ? nameObj.powermonitorname.obj[scope.row.powermonitorname] : scope.row.powermonitorname }}</span>
                    </template>
                    </el-table-column>
                    <el-table-column
                        sortable
                        prop="itemname"
                        label="监测项目名称"
                        min-width="100px"
                        :show-overflow-tooltip="true"
                    >
                     <template slot-scope="scope">
                            <span>{{ nameObj.itemname.obj[scope.row.itemname] ? nameObj.itemname.obj[scope.row.itemname] : scope.row.itemname }}</span>
                    </template>
                    </el-table-column>
                    <el-table-column
                        sortable
                        prop="monitoringvalue"
                        label="监测值"
                        min-width="100px"
                        :show-overflow-tooltip="true"
                    >
                    <template slot-scope="scope">
                                <el-form-item
                                    v-if="scope.row.isSelection"
                                >
                                    <el-input clearable
                                        style="width: 90%;"
                                        v-model="tableFormDataObj[scope.row.seq].monitoringvalue"
                                        refcous="true"
                                    ></el-input>
                                    <template slot="error" slot-scope="scope">
                                        <p class="error" :title="scope.error">{{ scope.error }}</p>
                                    </template>
                                </el-form-item>
                                <span v-else>{{scope.row.monitoringvalue}}</span>
                            </template>
                    </el-table-column>
                    <el-table-column
                        sortable
                        prop="unit"
                        label="单位"
                        min-width="100px"
                        :show-overflow-tooltip="true"
                    ></el-table-column>
                    <el-table-column
                        sortable
                        prop="monitordate"
                        label="监测日期"
                        min-width="100px"
                        :show-overflow-tooltip="true"
                    ></el-table-column>
                    <el-table-column
                        sortable
                        prop="batchno"
                        label="化验单号"
                        min-width="100px"
                        :show-overflow-tooltip="true"
                    ></el-table-column>
                    <el-table-column
                        sortable
                        prop="datadate"
                        label="上传时间"
                        min-width="100px"
                        :show-overflow-tooltip="true"
                    ></el-table-column>
                    <el-table-column
                        sortable
                        prop="analyst"
                        label="分析人"
                        min-width="100px"
                        :show-overflow-tooltip="true"
                    ></el-table-column>
                    <el-table-column
                        sortable
                        prop="note"
                        label="备注"
                        min-width="100px"
                        :show-overflow-tooltip="true"
                    >
                    <template slot-scope="scope">
                                <el-form-item
                                    v-if="scope.row.isSelection"
                                >
                                    <el-input clearable
                                        style="width: 90%;"
                                        v-model="tableFormDataObj[scope.row.seq].note"
                                        refcous="true"
                                    ></el-input>
                                    <template slot="error" slot-scope="scope">
                                        <p class="error" :title="scope.error">{{ scope.error }}</p>
                                    </template>
                                </el-form-item>
                                <span v-else>{{scope.row.note}}</span>
                            </template>
                    </el-table-column>
                </el-table>
                </el-form>
                <el-pagination
                    layout="total, sizes, prev, pager, next, jumper"
                    :total="total"
                    :page-sizes="[10, 20, 50, 100, 500, 1000]"
                    :page-size="pageSize"
                    :current-page.sync="pageNum"
                    @size-change="tableSizeChange"
                    @current-change="getTableData()"
                    style="text-align: right;margin-top: 10px;"
                ></el-pagination>
            </div>
        </div>
    </div>
</template>
<script>
import timegranDate from '~/components/zg/timegranDate.vue'
export default {
    name: 'powerMonitoringDayData',
     components: {
        'zj-timegran-date': timegranDate
    },
    data () {
        return {
            activeMenu: '',
            filterForm: {
                show: true,
                data: {
                    monitoringplan: '',
                    detectiondepartment: '',
                    systemname: '',
                    powermonitorname: '',
                    powersystemname: '',
                    monitordate: '',
                    batchno: ''
                },
                rules: {

                }
            },
            pageNum: 1,
            pageSize: 20,
            total: 0,
            loading: false,
            singleTableHeight: 100,
            tableFormDataObj: {},
            multipleSelection: [],
            tableData: [
                // {
                //     detectiondepartment: '',
                //     systemname: '',
                //     powermonitorname: '',
                //     itemname: '',
                //     monitordate: '',
                //     batchno: '',
                //     datadate: '',
                //     monitoringvalue: '',
                //     unit: '',
                //     analyst: '',
                //     note: ''
                // }
            ],
            nameObj: {
                monitoringplan: {
                    obj: {},
                    arr: []
                },
                detectiondepartment: {
                    obj: {},
                    arr: []
                },
                systemname: {
                    obj: {},
                    arr: []
                },
                powermonitorname: {
                    obj: {},
                    arr: []
                },
                powersystemname: {
                    obj: {},
                    arr: []
                },
                itemname: {
                    obj: {},
                    arr: []
                }
            },
            tableLoading: false,
            dialog: {
                editorBox: {
                    show: false,
                    type: '',
                    form: {
                        data: {
                            detectiondepartment: '',
                            systemname: '',
                            powermonitorname: '',
                            powersystemname: '',
                            itemname: '',
                            monitordate: '',
                            batchno: '',
                            datadate: '',
                            monitoringvalue: '',
                            unit: '',
                            analyst: '',
                            note: ''
                        },
                        rules: {

                        }
                    }
                }
            }
        }
    },
    created () {
        this.activeMenu = window.localStorage.getItem('activeMenu');
    },
    mounted () {
        let that = this;
        window.PEDataObj = {
            // 将数据绑定到window上，供main页面使用
            vm: that,
            // tableArr：用于导出成Excel的表格的信息
            tableArr: [
                {
                    name: '',
                    id: 'singleTable'
                }
            ]
        };
        that.$nextTick(() => {
            // 立即获取的height有一定偏差，通过setTimeout延迟来解决
            setTimeout(() => {
                that.singleTableHeight = that.getRoleHeight(that.$refs['singleTable'].$el) - 45;
            }, 1);
        });
        that.getMonitoringPlanData();
        that.getSystemNameData();
        that.getPowermonitorNameData();
        that.getItemNameData();
        that.getDetectiondepartmentData();
    },
    methods: {
        //  计算树区域高度
        getRoleHeight (dom) {
            return window.innerHeight - dom.offsetTop;
        },
        // 用于表格特殊列的过滤方法（:sort-by="function(row, index) { return sortFoo() }"）
        sortFoo (row, index, objName, name) {
            name = name || objName;
            let s = this.nameObj[objName].obj[row[name]] ? this.nameObj[objName].obj[row[name]] : row[name];
            return s;
        },
        // 获取监测计划
        getSystemNameData () {
            let that = this
            let url = 'pass/ems/v1/tcm0315s/getplanidandname/';
            that.axios.get(url)
                .then(function (res) {
                    if (res.code === '0') {
                        let arr = [];
                        let obj = {};
                        for (let item of res.data) {
                            arr.push({
                                id: item.planid,
                                name: item.name
                            })
                            obj[item.planid] = item.name;
                        }
                        that.nameObj.systemname.arr = arr;
                        that.nameObj.systemname.obj = obj;
                    } else {
                        that.$message.error(res.message);
                    }
                });
        },
        // 获取系统名称
        getMonitoringPlanData () {
            let that = this
            let url = 'pass/ems/v1/tcm0325s/getCodeAndName/';
            that.axios.get(url)
                .then(function (res) {
                    if (res.code === '0') {
                        let arr = [];
                        let obj = {};
                        for (let item of res.data) {
                            arr.push({
                                id: item.powercode,
                                name: item.powername
                            })
                            obj[item.powercode] = item.powername;
                        }
                        that.nameObj.powersystemname.arr = arr;
                        that.nameObj.powersystemname.obj = obj;
                    } else {
                        that.$message.error(res.message);
                    }
                });
        },
        // 获取监测点名称
        getPowermonitorNameData () {
            let that = this
            let url = 'pass/ems/v1/tcm0316s/getidandname/';
            that.axios.get(url)
                .then(function (res) {
                    if (res.code === '0') {
                        let arr = [];
                        let obj = {};
                        for (let item of res.data) {
                            arr.push({
                                id: item.powermonitorcode,
                                name: item.powermonitorname
                            })
                            obj[item.powermonitorcode] = item.powermonitorname;
                        }
                        that.nameObj.powermonitorname.arr = arr;
                        that.nameObj.powermonitorname.obj = obj;
                    } else {
                        that.$message.error(res.message);
                    }
                });
        },
        // 获取监测项目
        getItemNameData () {
            let that = this
            let url = 'pass/ems/v1/tcm0323s/getidandname/';
            that.axios.get(url)
                .then(function (res) {
                    if (res.code === '0') {
                        let arr = [];
                        let obj = {};
                        for (let item of res.data) {
                            arr.push({
                                id: item.itemcode,
                                name: item.itemname
                            })
                            obj[item.itemcode] = item.itemname;
                        }
                        that.nameObj.itemname.arr = arr;
                        that.nameObj.itemname.obj = obj;
                    } else {
                        that.$message.error(res.message);
                    }
                });
        },
        getDetectiondepartmentData () {
            let that = this
            let url = 'pass/ems/v1/tcmcodeitems/DETECTIONDEPARTMENT';
            that.axios.get(url)
                .then(function (res) {
                    if (res.code === '0') {
                        let arr = [];
                        let obj = {};
                        for (let item of res.data) {
                            arr.push({
                                id: item.itemcode,
                                name: item.itemname
                            })
                            obj[item.itemcode] = item.itemname;
                        }
                        that.nameObj.detectiondepartment.arr = arr;
                        that.nameObj.detectiondepartment.obj = obj;
                    } else {
                        that.$message.error(res.message);
                    }
                });
        },
        but_edit_plural () {
            let that = this;
            if (that.multipleSelection.length > 0) {
                that.$refs['dialog_form_arr'].validate((valid, obj) => {
                   if (valid) {
                    that.loading = true;
                    let SubmitData = [];
                    console.log(that.tableFormDataObj)
                    for (let key in that.tableFormDataObj) {
                        SubmitData.push({
                            powermonitorname: that.tableFormDataObj[key].powermonitorname,
                            batchno: that.tableFormDataObj[key].batchno,
                            sitem: that.tableFormDataObj[key].itemname,
                            powersystemname: that.tableFormDataObj[key].powersystemname,
                            monitordate: that.tableFormDataObj[key].monitordate,
                            unit: that.tableFormDataObj[key].unit,
                            analyst: that.tableFormDataObj[key].analyst,
                            monitoringvalue: that.tableFormDataObj[key].monitoringvalue,
                            note: that.tableFormDataObj[key].note
                        })
                    }
                        that.axios.put('pass/ems/v1/tcm0348s/', SubmitData)
                        .then(function (res) {
                            if (res.code === '0') {
                                that.$message({
                                message: '修改成功',
                                 type: 'success'
                                });
                                that.getTableData();
                                that.dialog.editorBox.show = false;
                                } else {
                                    that.$message.error(res.message);
                                }
                                that.loading = false;
                        })
                        .catch(function () {
                            that.loading = false;
                        });
                   }
                });
            }
        },
        // 获取表格中的数据
        getTableData (pageNum) {
            let that = this,
                params = {
                    powermonitorname: that.filterForm.data.powermonitorname.join(','),
                    monitoringvalue: that.filterForm.data.monitoringvalue,
                    batchno: that.filterForm.data.batchno,
                    sitem: that.filterForm.data.itemname.join(','),
                    startTime: that.filterForm.data.monitordate[0],
                    endTime: that.filterForm.data.monitordate[1],
                    powersystemname: that.filterForm.data.powersystemname.join(','),
                };
            that.pageNum = pageNum || that.pageNum;
            that.tableLoading = true;
            let url = 'pass/ems/v1/tcm0348s/?pageNum=' + that.pageNum + '&pageSize=' + that.pageSize;
            that.axios.get(url, {
                params: params
            })
                .then(function (res) {
                    if (res.code === '0') {
                        let arr = [];
                        for (let i = 0; i < res.data.list.length; i++) {
                            let item = res.data.list[i];
                            arr.push({
                                seq: i,
                                recordid: item.recordid,
                                detectiondepartment: item.powerdetecdepartment,
                                powersystemname: item.powersystemname,
                                powermonitorname: item.powermonitorname,
                                itemname: item.sitem,
                                monitordate: item.monitordate,
                                batchno: item.batchno,
                                datadate: item.datadate,
                                monitoringvalue: item.monitoringvalue,
                                unit: item.unit,
                                analyst: item.analyst,
                                note: item.note
                            })
                        }
                        // for (let item of res.data.list) {
                        that.tableData = arr;
                        that.total = res.data.total;
                        // }
                    } else {
                        that.$message.error(res.message);
                    }
                    that.tableLoading = false;
                }).catch(function () {
                    that.tableLoading = false;
                });
        },
        // 改变表格显示条数
        tableSizeChange (val) {
            let that = this;
            that.pageSize = val;
            that.getTableData(1);
        },
        // 重置搜索
        tableDataCancel () {
            let that = this;
            for (let key in that.filterForm.data) {
                if (that.filterForm.data[key] instanceof Array) {
                    that.filterForm.data[key] = [];
                } else {
                    that.filterForm.data[key] = '';
                }
            }
            that.getTableData(1);
        },
        but_edit (row) {
            let that = this;
            for (let key in that.dialog.editorBox.form.data) {
                if (typeof row[key] !== 'undefined') {
                    that.dialog.editorBox.form.data[key] = row[key];
                }
            }
            that.dialog.editorBox.type = 'edit';
            that.dialog.editorBox.show = true;
        },
        handleSelectionChange (val) {
            let that = this;
            let tableFormDataObj = {};
            for (let item of that.tableData) {
                item.isSelection = false;
            }
            for (let item of val) {
                let obj = {};
                let xId = item.seq;
                if (that.tableFormDataObj[xId]) {
                    tableFormDataObj[xId] = that.tableFormDataObj[xId];
                } else {
                    for (let key in item) {
                        obj[key] = item[key];
                    }
                    tableFormDataObj[xId] = obj;
                }
                item.isSelection = true;
            }
            that.tableFormDataObj = tableFormDataObj;
            console.log(that.tableFormDataObj)
            this.multipleSelection = val;
        },
        dataSave () {
            let that = this;
            let SubmitData = {
                _id: that.dialog.editorBox.form.data.recordid,
                monitordate: that.dialog.editorBox.form.data.monitordate,
                batchno: that.dialog.editorBox.form.data.batchno,
                datadate: that.dialog.editorBox.form.data.datadate,
                monitoringvalue: that.dialog.editorBox.form.data.monitoringvalue,
                analyst: that.dialog.editorBox.form.data.analyst,
                note: that.dialog.editorBox.form.data.note
            };
            that.$refs['dialog_form'].validate((valid) => {
                if (valid) {
                    that.loading = true;
                    that.axios.put('pass/ems/v1/tcm0348s/' + SubmitData._id, SubmitData)
                        .then(function (res) {
                            if (res.code === '0') {
                                that.$message({
                                    message: '修改成功',
                                    type: 'success'
                                });
                                that.getTableData();
                                that.dialog.editorBox.show = false;
                            } else {
                                that.$message.error(res.message);
                            }
                            that.loading = false;
                        }).catch(function () {
                            that.loading = false;
                        });
                }
            });
        }
    }
}
</script>

<style lang="less">
.powerMonitoringDayData {
    min-width: 700px;
    height: 100%;
    .box {
        height: 100%;
        padding: 15px 15px 0 15px;
        .box-top {
            .el-form-item {
                margin-bottom: 7px;
            }
            .box-top-gjl {
                overflow: hidden;
                padding: 7px 0;
                border-top: 1px solid #ccc;
                // border-bottom: 1px solid #ccc;
                // margin-bottom: 6px;
            }
        }
    }
    .el-table__body .el-form-item--mini.el-form-item {
        margin: 0px;
        .error {
            overflow: hidden;
            color: #f56c6c;
            font-size: 12px;
            line-height: 1;
        }
    }
}
</style>
